118 HJ 163 IH: Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to “New Source Performance Standards for Greenhouse Gas Emissions From New, Modified, and Reconstructed Fossil Fuel-Fired Electric Generating Units; Emission Guidelines for Greenhouse Gas Emissions From Existing Fossil Fuel-Fired Electric Generating Units; and Repeal of the Affordable Clean Energy Rule”.
U.S. House of Representatives
2024-06-05
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
IA
118th CONGRESS
2d Session
H. J. RES. 163
IN THE HOUSE OF REPRESENTATIVES
June 5, 2024
Mr. Balderson (for himself, Mr. Carter of Georgia, Mr. Duncan, Mr. Armstrong, Mr. Hudson, Mrs. Miller of West Virginia, Mr. Pence, Mr. Griffith, Mr. Fulcher, Mr. Pfluger, Mr. Weber of Texas, Mrs. Miller-Meeks, Mr. Curtis, Mr. Roy, Mr. Joyce of Pennsylvania, Mr. Latta, Mr. Carey, Mr. Ezell, Mr. Davidson, Ms. Van Duyne, Mr. Meuser, Mr. Perry, Mr. Amodei, Mr. Burchett, Mr. Guthrie, Ms. Hageman, Mrs. Lesko, Mr. Burgess, Mr. Allen, Mr. Rosendale, Mr. Moolenaar, Mr. Wenstrup, Mr. Norman, Mrs. Harshbarger, Mr. Fry, Mr. Dunn of Florida, Mr. Crenshaw, Mr. Bean of Florida, Mrs. Bice, Mr. Miller of Ohio, Mr. Fallon, Mr. Smucker, Mr. Graves of Missouri, Ms. Tenney, Mr. Bucshon, Mrs. Hinson, Mr. Walberg, Mr. Bilirakis, Mr. Palmer, Mr. Johnson of South Dakota, Mr. Baird, Mr. Reschenthaler, Mr. Rogers of Alabama, Mr. Biggs, Mr. Rouzer, Mr. Kelly of Pennsylvania, Mr. Owens, Mr. Clyde, Mr. Arrington, Mr. Nehls, Ms. Lee of Florida, Mr. Mann, Mr. Simpson, Mr. Rogers of Kentucky, Mr. Wilson of South Carolina, Mr. Stauber, Mr. Luetkemeyer, Mr. Carl, Mr. Flood, Mr. Lucas, Mr. Banks, Mrs. Fischbach, Mr. Fitzgerald, Mr. Grothman, Mr. Carter of Texas, Mr. Hern, Mr. Finstad, Mr. Cole, Mr. Aderholt, Mr. Newhouse, Mr. Fleischmann, Mr. Ogles, Mr. Obernolte, Mr. Donalds, Mr. Mooney, Mr. Kelly of Mississippi, Mr. McHenry, Mr. DesJarlais, Mr. Van Orden, Mr. LaTurner, Mr. Burlison, Mr. Timmons, Mr. Wittman, Ms. Maloy, Mr. Estes, Mr. Guest, Mr. Crane, Mr. Moore of Utah, Mr. Yakym, Mr. Cloud, Mr. Smith of Nebraska, Mr. Langworthy, Mrs. Miller of Illinois, Mr. Scott Franklin of Florida, Mr. Gooden of Texas, Mr. Joyce of Ohio, Mr. Gosar, Mr. Crawford, Mr. Womack, Mr. Comer, Mr. Zinke, Mr. Feenstra, Mr. Tiffany, Mr. Strong, Mr. Westerman, Mr. Lamborn, Mr. Thompson of Pennsylvania, Mr. Ferguson, Mr. Austin Scott of Georgia, Mrs. Cammack, Mr. Alford, Mr. LaMalfa, Mr. Bost, Mr. Jordan, Mr. Turner, Mr. Jackson of Texas, Mr. Higgins of Louisiana, Mr. James, Mrs. Houchin, Mr. Sessions, Ms. Boebert, Mr. Moran, Mr. Fong, Mr. Edwards, Mr. Graves of Louisiana, Mr. Rutherford, Mr. Bishop of North Carolina, Mr. Bentz, and Mr. Collins) submitted the following joint resolution; which was referred to the Committee on Energy and Commerce
JOINT RESOLUTION
Providing for congressional disapproval under chapter 8 of title 5, United States Code, of the rule submitted by the Environmental Protection Agency relating to “New Source Performance Standards for Greenhouse Gas Emissions From New, Modified, and Reconstructed Fossil Fuel-Fired Electric Generating Units; Emission Guidelines for Greenhouse Gas Emissions From Existing Fossil Fuel-Fired Electric Generating Units; and Repeal of the Affordable Clean Energy Rule”.
That Congress disapproves the rule submitted by the Environmental Protection Agency relating to “New Source Performance Standards for Greenhouse Gas Emissions From New, Modified, and Reconstructed Fossil Fuel-Fired Electric Generating Units; Emission Guidelines for Greenhouse Gas Emissions From Existing Fossil Fuel-Fired Electric Generating Units; and Repeal of the Affordable Clean Energy Rule” (89 Fed. Reg. 39798 (May 9, 2024)), and such rule shall have no force or effect.